X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cf700088838290a296a0adf9f401702c095934de..dcbd177f06597f98aae27bf53a4c98b4739102c7:/docs/latex/wx/outptstr.tex

diff --git a/docs/latex/wx/outptstr.tex b/docs/latex/wx/outptstr.tex
index 33320e4997..9cd305c6b9 100644
--- a/docs/latex/wx/outptstr.tex
+++ b/docs/latex/wx/outptstr.tex
@@ -42,7 +42,7 @@ Returns the number of bytes written during the last
 error on the stream if it is only temporarily impossible to write to it.
 
 
-\membersection{wxOutputStream::PutC}
+\membersection{wxOutputStream::PutC}\label{wxoutputstreamputc}
 
 \func{void}{PutC}{\param{char}{ c}}
 
