X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cf3da716f65a419cddc25bdb70ccd7cbe4a3afa7..80d2803f703d1b238f42725504f08266ef02defe:/docs/latex/wx/scrolwin.tex?ds=sidebyside

diff --git a/docs/latex/wx/scrolwin.tex b/docs/latex/wx/scrolwin.tex
index 1bdf47ea15..bfe54c172b 100644
--- a/docs/latex/wx/scrolwin.tex
+++ b/docs/latex/wx/scrolwin.tex
@@ -16,7 +16,7 @@ scroll position.
 
 A wxScrolledWindow will normally scroll itself and therefore its child windows as well. It
 might however be desired to scroll a different window than itself: e.g. when designing a
-spreadsheet, you'll normally only have to scroll the (usually white) cell area, whereas the
+spreadsheet, you will normally only have to scroll the (usually white) cell area, whereas the
 (usually grey) label area will scroll very differently. For this special purpose, you can
 call \helpref{SetTargetWindow}{wxscrolledwindowsettargetwindow} which means that pressing
 the scrollbars will scroll a different window.
@@ -301,7 +301,8 @@ that direction).
 
 \func{void}{SetScrollbars}{\param{int}{ pixelsPerUnitX}, \param{int}{ pixelsPerUnitY},\rtfsp
 \param{int}{ noUnitsX}, \param{int}{ noUnitsY},\rtfsp
-\param{int }{xPos = 0}, \param{int}{ yPos = 0}}
+\param{int }{xPos = 0}, \param{int}{ yPos = 0},\rtfsp
+\param{bool }{noRefresh = FALSE}}
 
 Sets up vertical and/or horizontal scrollbars.
 
@@ -319,6 +320,8 @@ Sets up vertical and/or horizontal scrollbars.
 
 \docparam{yPos}{Position to initialize the scrollbars in the vertical direction, in scroll units.}
 
+\docparam{noRefresh}{Will not refresh window if TRUE.}
+
 \wxheading{Remarks}
 
 The first pair of parameters give the number of pixels per `scroll step', i.e. amount
