X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/ce9a75d225a393cd09681aeda19bec908e4c622d..7e9a386e10bf434956b4deb1e9a1cd45693c947f:/docs/latex/wx/image.tex

diff --git a/docs/latex/wx/image.tex b/docs/latex/wx/image.tex
index c99c8a9ecd..fb4e77ba28 100644
--- a/docs/latex/wx/image.tex
+++ b/docs/latex/wx/image.tex
@@ -437,8 +437,8 @@ mimetype to the named file}
 
 \func{wxImage}{Rescale}{\param{int}{ width}, \param{int}{ height}}
 
-Changes the size of the image in-place: after a call to this function, thei
-mage will have the given width and height.
+Changes the size of the image in-place: after a call to this function, the
+image will have the given width and height.
 
 \wxheading{See also}
 
@@ -478,6 +478,13 @@ Example:
 
 \helpref{Rescale}{wximagerescale}
 
+\membersection{wxImage::GetSubImage}\label{wximagegetsubimage}
+
+\constfunc{wxImage}{GetSubImage}{\param{const wxRect&}{rect}}
+
+Returns a sub image of the current one as long as the rect belongs entirely to 
+the image.
+
 \membersection{wxImage::SetData}\label{wximagesetdata}
 
 \func{void}{SetData}{\param{unsigned char*}{data}}
