X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/ce321570b08e1a2937415ef6388a1a98fd1c4b83..677b38f28e645e362aedc11758bdda935f71ebfa:/docs/latex/wx/url.tex?ds=sidebyside

diff --git a/docs/latex/wx/url.tex b/docs/latex/wx/url.tex
index 7452671911..562291e109 100644
--- a/docs/latex/wx/url.tex
+++ b/docs/latex/wx/url.tex
@@ -80,9 +80,9 @@ It can be one of these errors:
 
 \func{wxInputStream *}{GetInputStream}{\void}
 
-Creates a new input stream on the the specified URL. You can use all but seek
-functionality of wxStream. Seek isn't available on all stream. For example,
-http or ftp streams doesn't deal with it.
+Creates a new input stream on the specified URL. You can use all but seek
+functionality of wxStream. Seek isn't available on all streams. For example,
+HTTP or FTP streams don't deal with it.
 
 Note that this method is somewhat depreciated, all future wxWidgets applications
 should really use \helpref{wxFileSystem}{wxfilesystem} instead.
