X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/ce2f50e34a191c323781d4a86aa333b9571b8d76..4c7852186d48a5b8f406462c2c3fa020f0a052bb:/docs/latex/wx/text.tex

diff --git a/docs/latex/wx/text.tex b/docs/latex/wx/text.tex
index e6dc093d12..724f33a98c 100644
--- a/docs/latex/wx/text.tex
+++ b/docs/latex/wx/text.tex
@@ -83,6 +83,11 @@ when the text controls contents changes - whether this is due to user input or
 comes from the program itself (for example, if SetValue() is called)}
 \twocolitem{{\bf EVT\_TEXT\_ENTER(id, func)}}{Respond to a wxEVT\_COMMAND\_TEXT\_ENTER event,
 generated when enter is pressed in a single-line text control.}
+\twocolitem{{\bf EVT\_TEXT\_URL(id, func)}}{A mouse event occured over an URL
+in the text control (Win32 only)}
+\twocolitem{{\bf EVT\_TEXT\_MAXLEN(id, func)}}{User tried to enter more text
+into the control than the limit set by 
+\helpref{SetMaxLength}{wxtextctrlsetmaxlength}.}
 \end{twocollist}%
 
 %\wxheading{See also}
@@ -522,6 +527,10 @@ This function sets the maximum number of characters the user can enter into the
 control. In other words, it allows to limit the text value length to {\it len}
 not counting the terminating {\tt NUL} character.
 
+If {\it len} is $0$, the previously set max length limi, if any, is discarded
+and the user may enter as much text as the underlying native text control
+widget supports (typically at least 32Kb).
+
 If the user tries to enter more characters into the text control when it
 already is filled up to the maximal length, a 
 {\tt wxEVT\_COMMAND\_TEXT\_MAXLEN} event is sent to notify the program about it
