X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/ce045aed585af0f00b72f1cdba893b47ac2e0e55..7dd40b6f4b31e6bc9c7f626f1461aff8adf7714c:/docs/latex/wx/image.tex

diff --git a/docs/latex/wx/image.tex b/docs/latex/wx/image.tex
index 181a074db6..bd9b723e0e 100644
--- a/docs/latex/wx/image.tex
+++ b/docs/latex/wx/image.tex
@@ -1099,7 +1099,7 @@ the function will allocate the alpha array internally -- this is useful to add
 alpha channel data to an image which doesn't have any. If the pointer is not
 {\tt NULL}, it must have one byte for each image pixel and be allocated with
 {\tt malloc()}. wxImage takes ownership of the pointer and will free it unless
-\arg{static\_data} parameter is set.to \true -- in this case the caller should
+\arg{static\_data} parameter is set to \true -- in this case the caller should
 do it.
 
 \func{void}{SetAlpha}{\param{int }{x}, \param{int }{y}, \param{unsigned char }{alpha}}
