X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cde5a85767852f1af2debc97bbf60b7f04da5541..34c07b8b63651e46aabb7809c25d95dd40736687:/docs/latex/wx/sysopt.tex

diff --git a/docs/latex/wx/sysopt.tex b/docs/latex/wx/sysopt.tex
index 6f9d54436d..99a4d5129a 100644
--- a/docs/latex/wx/sysopt.tex
+++ b/docs/latex/wx/sysopt.tex
@@ -28,6 +28,9 @@ pages).}
 \twocolitem{msw.staticbox.optimized-paint}{If set to 0, switches off optimized wxStaticBox painting.
 Setting this to 0 causes more flicker, but allows applications to paint graphics on the parent of a static box
 (the optimized refresh causes any such drawing to disappear).}
+\twocolitem{msw.display.directdraw}{If set to 1, use DirectDraw-based implementation of
+\helpref{wxDisplay}{wxdisplay}. By default the standard Win32 functions are
+used.}
 \end{twocollist}
 
 \wxheading{Mac}
