X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cd6ce4a90c11b54cc00799d0e4611d858739a749..d83eeece0ee86a3ad81096d894a560647cef0d3a:/docs/latex/wx/inputstr.tex?ds=sidebyside

diff --git a/docs/latex/wx/inputstr.tex b/docs/latex/wx/inputstr.tex
index 236b1657c7..a46d41fa39 100644
--- a/docs/latex/wx/inputstr.tex
+++ b/docs/latex/wx/inputstr.tex
@@ -13,6 +13,8 @@ wxInputStream is an abstract base class which may not be used directly.
 
 <wx/stream.h>
 
+\latexignore{\rtfignore{\wxheading{Members}}}
+
 % -----------
 % ctor & dtor
 % -----------
@@ -38,7 +40,7 @@ Returns the first character in the input queue and removes it.
 
 \constfunc{wxInputStream}{Eof}{\void}
 
-Returns TRUE if the end of stream has been reached.
+Returns true if the end of stream has been reached.
 
 \membersection{wxInputStream::LastRead}\label{wxinputstreamlastread}
 
@@ -89,12 +91,12 @@ Changes the stream current position.
 
 Returns the current stream position.
 
-\membersection{wxInputStream::Ungetch}\label{wxinputstream_ungetch}
+\membersection{wxInputStream::Ungetch}\label{wxinputstreamungetch}
 
 \func{size\_t}{Ungetch}{\param{const char*}{ buffer}, \param{size\_t}{ size}}
 
 This function is only useful in {\it read} mode. It is the manager of the "Write-Back"
-buffer. This buffer acts like a temporary buffer where datas which has to be
+buffer. This buffer acts like a temporary buffer where data which has to be
 read during the next read IO call are put. This is useful when you get a big
 block of data which you didn't want to read: you can replace them at the top
 of the input queue by this way.
