X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cd6ce4a90c11b54cc00799d0e4611d858739a749..cdfb1ae1bcacb8327589a09e6a67f8fc1ef5a82e:/docs/latex/wx/strmbase.tex

diff --git a/docs/latex/wx/strmbase.tex b/docs/latex/wx/strmbase.tex
index 40ce15f24f..243e5a48ef 100644
--- a/docs/latex/wx/strmbase.tex
+++ b/docs/latex/wx/strmbase.tex
@@ -43,7 +43,7 @@ Destructor.
 
 \constfunc{wxStreamError}{IsOk}{\void}
 
-Returns TRUE if no error occured on the stream.
+Returns TRUE if no error occurred on the stream.
 
 \wxheading{See also}
 
@@ -54,12 +54,13 @@ Returns TRUE if no error occured on the stream.
 \constfunc{wxStreamError}{LastError}{\void}
 
 This function returns the last error.
+
 \twocolwidtha{5cm}
 \begin{twocollist}\itemsep=0pt
-\twocolitem{{\bf wxSTREAM\_NO\_ERROR}}{No error occured.}
-\twocolitem{{\bf wxSTREAM\_EOF}}{An End-Of-File occured.}
-\twocolitem{{\bf wxSTREAM\_WRITE\_ERROR}}{A generic error occured on the last write call.}
-\twocolitem{{\bf wxSTREAM\_READ\_ERROR}}{A generic error occured on the last read call.}
+\twocolitem{{\bf wxSTREAM\_NO\_ERROR}}{No error occurred.}
+\twocolitem{{\bf wxSTREAM\_EOF}}{An End-Of-File occurred.}
+\twocolitem{{\bf wxSTREAM\_WRITE\_ERROR}}{A generic error occurred on the last write call.}
+\twocolitem{{\bf wxSTREAM\_READ\_ERROR}}{A generic error occurred on the last read call.}
 \end{twocollist}
 
 \membersection{wxStreamBase::OnSysRead}\label{wxstreambaseonsysread}
