X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cd6ce4a90c11b54cc00799d0e4611d858739a749..8b6e6947fc8fb946391740d66b140413eccb6b6c:/docs/latex/wx/inputstr.tex?ds=inline

diff --git a/docs/latex/wx/inputstr.tex b/docs/latex/wx/inputstr.tex
index 236b1657c7..e830886624 100644
--- a/docs/latex/wx/inputstr.tex
+++ b/docs/latex/wx/inputstr.tex
@@ -13,6 +13,8 @@ wxInputStream is an abstract base class which may not be used directly.
 
 <wx/stream.h>
 
+\latexignore{\rtfignore{\wxheading{Members}}}
+
 % -----------
 % ctor & dtor
 % -----------
@@ -89,7 +91,7 @@ Changes the stream current position.
 
 Returns the current stream position.
 
-\membersection{wxInputStream::Ungetch}\label{wxinputstream_ungetch}
+\membersection{wxInputStream::Ungetch}\label{wxinputstreamungetch}
 
 \func{size\_t}{Ungetch}{\param{const char*}{ buffer}, \param{size\_t}{ size}}
 
