X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cd6ce4a90c11b54cc00799d0e4611d858739a749..0a7fd06a093ab7690a2a733aee8506eb26d8c417:/docs/latex/wx/strmbase.tex?ds=sidebyside

diff --git a/docs/latex/wx/strmbase.tex b/docs/latex/wx/strmbase.tex
index 40ce15f24f..141374c28f 100644
--- a/docs/latex/wx/strmbase.tex
+++ b/docs/latex/wx/strmbase.tex
@@ -3,7 +3,7 @@
 % -----------------------------------------------------------------------------
 \section{\class{wxStreamBase}}\label{wxstreambase}
 
-This class is the base class of most stream related classes in wxWindows. It must
+This class is the base class of most stream related classes in wxWidgets. It must
 not be used directly.
 
 \wxheading{Derived from}
@@ -43,23 +43,24 @@ Destructor.
 
 \constfunc{wxStreamError}{IsOk}{\void}
 
-Returns TRUE if no error occured on the stream.
+Returns true if no error occurred on the stream.
 
 \wxheading{See also}
 
-\helpref{LastError}{wxstreambaselasterror}
+\helpref{GetLastError}{wxstreambasegetlasterror}
 
-\membersection{wxStreamBase::LastError}\label{wxstreambaselasterror}
+\membersection{wxStreamBase::GetLastError}\label{wxstreambasegetlasterror}
 
-\constfunc{wxStreamError}{LastError}{\void}
+\constfunc{wxStreamError}{GetLastError}{\void}
 
 This function returns the last error.
+
 \twocolwidtha{5cm}
 \begin{twocollist}\itemsep=0pt
-\twocolitem{{\bf wxSTREAM\_NO\_ERROR}}{No error occured.}
-\twocolitem{{\bf wxSTREAM\_EOF}}{An End-Of-File occured.}
-\twocolitem{{\bf wxSTREAM\_WRITE\_ERROR}}{A generic error occured on the last write call.}
-\twocolitem{{\bf wxSTREAM\_READ\_ERROR}}{A generic error occured on the last read call.}
+\twocolitem{{\bf wxSTREAM\_NO\_ERROR}}{No error occurred.}
+\twocolitem{{\bf wxSTREAM\_EOF}}{An End-Of-File occurred.}
+\twocolitem{{\bf wxSTREAM\_WRITE\_ERROR}}{A generic error occurred on the last write call.}
+\twocolitem{{\bf wxSTREAM\_READ\_ERROR}}{A generic error occurred on the last read call.}
 \end{twocollist}
 
 \membersection{wxStreamBase::OnSysRead}\label{wxstreambaseonsysread}
@@ -99,9 +100,5 @@ the file.
 \wxheading{Warning}
 
 There are streams which do not have size by definition, such as socket streams.
-In that cases, GetSize returns an invalid size represented by
-
-\begin{verbatim}
-~(size_t)0
-\end{verbatim}
+In that cases, GetSize returns $0$ so you should always test its return value.
 
