X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/ccaaf5b08351d01b9ed1a83c0dc81764435cb4cc..c958260b3886cb83aa93c7508d0986c6433ce165:/docs/latex/wx/tlog.tex

diff --git a/docs/latex/wx/tlog.tex b/docs/latex/wx/tlog.tex
index de86933c68..7db8f6c4ee 100644
--- a/docs/latex/wx/tlog.tex
+++ b/docs/latex/wx/tlog.tex
@@ -92,7 +92,7 @@ works.
 wxWindows has the notion of a {\it log target}: it's just a class deriving
 from \helpref{wxLog}{wxlog}. As such, it implements the virtual functions of
 the base class which are called when a message is logged. Only one log target
-is {\it active} at any moment, this is the one used by \it{wxLogXXX()}
+is {\it active} at any moment, this is the one used by {\it wxLogXXX()}
 functions. The normal usage of a log object (i.e. object of a class derived
 from wxLog) is to install it as the active target with a call to {\it
 SetActiveTarget()} and it will be used automatically by all subsequent calls
