X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/ccaaf5b08351d01b9ed1a83c0dc81764435cb4cc..50c538600e7586c256fe0145ac8054f045be6fbb:/docs/latex/wx/ttab.tex

diff --git a/docs/latex/wx/ttab.tex b/docs/latex/wx/ttab.tex
index 2e594f4470..b3b4112c82 100644
--- a/docs/latex/wx/ttab.tex
+++ b/docs/latex/wx/ttab.tex
@@ -112,7 +112,7 @@ void MyDialog::Init(void)
   // Calculate the tab width for 4 tabs, based on a view width of 326 and
   // the current horizontal spacing. Adjust the view width to exactly fit
   // the tabs.
-  view->CalculateTabWidth(4, TRUE);
+  view->CalculateTabWidth(4, true);
 
   if (!view->AddTab(TEST_TAB_CAT,        wxString("Cat")))
     return;
