X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/ccaaf5b08351d01b9ed1a83c0dc81764435cb4cc..2aa59ef43663cefcc4e76ab4f7ebc49ed0e4bb9e:/docs/latex/wx/evthand.tex

diff --git a/docs/latex/wx/evthand.tex b/docs/latex/wx/evthand.tex
index 84bd8b92b4..79bec64648 100644
--- a/docs/latex/wx/evthand.tex
+++ b/docs/latex/wx/evthand.tex
@@ -101,11 +101,11 @@ is an alternative to the use of static event tables. See the 'dynamic' sample fo
 \membersection{wxEvtHandler::Disconnect}\label{wxevthandlerdisconnect}
 
 \func{bool}{Disconnect}{\param{int}{ id},
- \param{wxEventType }{eventType = wxEVT_NULL}, \param{wxObjectEventFunction}{ function = NULL},
+ \param{wxEventType }{eventType = wxEVT\_NULL}, \param{wxObjectEventFunction}{ function = NULL},
  \param{wxObject*}{ userData = NULL}}
 
 \func{bool}{Disconnect}{\param{int}{ id}, \param{int}{ lastId = -1},
- \param{wxEventType }{eventType = wxEVT_NULL}, \param{wxObjectEventFunction}{ function = NULL},
+ \param{wxEventType }{eventType = wxEVT\_NULL}, \param{wxObjectEventFunction}{ function = NULL},
  \param{wxObject*}{ userData = NULL}}
 
 Disconnects the given function dynamically from the event handler, using the specified
