X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cc81d32f2bf8c159f3b1bf6ddaf62e6d77720209..f050223c833f26debd148142d800dd5bce1c56bd:/docs/latex/wx/dialup.tex?ds=inline

diff --git a/docs/latex/wx/dialup.tex b/docs/latex/wx/dialup.tex
index 7a46fa6f00..41ca690b6a 100644
--- a/docs/latex/wx/dialup.tex
+++ b/docs/latex/wx/dialup.tex
@@ -6,7 +6,7 @@
 %% Created:     08.04.00
 %% RCS-ID:      $Id$
 %% Copyright:   (c) Vadim Zeitlin
-%% License:     wxWindows license
+%% License:     wxWidgets license
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
 
 \section{\class{wxDialUpManager}}\label{wxdialupmanager}
@@ -22,7 +22,7 @@ network the next time or, on the contrary, to stop receiving data from the net
 when the user hangs up the modem). For this, you need to use one of the event
 macros described below.
 
-This class is different from other wxWindows classes in that there is at most
+This class is different from other wxWidgets classes in that there is at most
 one instance of this class in the program accessed via 
 \helpref{wxDialUpManager::Create()}{wxdialupmanagercreate} and you can't
 create the objects of this class directly.
@@ -203,7 +203,7 @@ is always safe to call. The default value is {\tt www.yahoo.com:80}.
 
 \membersection{wxDialUpManager::SetConnectCommand}\label{wxdialupmanagersetconnectcommand}
 
-\func{}{SetConnectCommand}{\param{const wxString\& }{commandDial = wxT("/usr/bin/pon")}, \param{const wxString\& }{commandHangup = wxT("/usr/bin/poff")}}
+\func{void}{SetConnectCommand}{\param{const wxString\& }{commandDial = wxT("/usr/bin/pon")}, \param{const wxString\& }{commandHangup = wxT("/usr/bin/poff")}}
 
 This method is for Unix only.
 
