X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cc81d32f2bf8c159f3b1bf6ddaf62e6d77720209..eec47cc6c45a2d9a474cae9da897ebfdb0b7be21:/docs/latex/wx/database.tex?ds=sidebyside

diff --git a/docs/latex/wx/database.tex b/docs/latex/wx/database.tex
index ebbc51279a..3f188cae4e 100644
--- a/docs/latex/wx/database.tex
+++ b/docs/latex/wx/database.tex
@@ -77,20 +77,6 @@ and disconnects from the current data source.
 
 Commits previous transactions. Not implemented.
 
-\membersection{wxDatabase::ErrorOccured}
-
-\func{bool}{ErrorOccured}{\void}
-
-Returns true if the last action caused an error.
-
-\membersection{wxDatabase::ErrorSnapshot}
-
-\func{void}{ErrorSnapshot}{\param{HSTMT}{ statement = SQL\_NULL\_HSTMT}}
-
-This function will be called whenever an ODBC error occured. It stores the
-error related information returned by ODBC. If a statement handle of the
-concerning ODBC action is available it should be passed to the function.
-
 \membersection{wxDatabase::GetDatabaseName}
 
 \func{wxString}{GetDatabaseName}{\void}
