X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cc81d32f2bf8c159f3b1bf6ddaf62e6d77720209..ec59d2ccea39b0225f49e6dd326d4d11940d656d:/docs/latex/wx/tapp.tex

diff --git a/docs/latex/wx/tapp.tex b/docs/latex/wx/tapp.tex
index f748843b83..04447cc9c1 100644
--- a/docs/latex/wx/tapp.tex
+++ b/docs/latex/wx/tapp.tex
@@ -54,7 +54,9 @@ because required global initialization may not have been performed at applicatio
 construction time.
 
 You can also use DECLARE\_APP(appClass) in a header file to declare the wxGetApp function which returns
-a reference to the application object.
+a reference to the application object. Otherwise you can only use the global 
+\texttt{wxTheApp} pointer which is of type \texttt{wxApp *}.
+
 
 \subsection{Application shutdown}\label{wxappshutdownoverview}
 
