X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cc81d32f2bf8c159f3b1bf6ddaf62e6d77720209..e53a95bcb122a06a74e116aba717b0d7a5bdc1b8:/docs/latex/wx/sashwin.tex

diff --git a/docs/latex/wx/sashwin.tex b/docs/latex/wx/sashwin.tex
index dc25937b60..bff4b340e3 100644
--- a/docs/latex/wx/sashwin.tex
+++ b/docs/latex/wx/sashwin.tex
@@ -60,7 +60,7 @@ enum wxSashEdgePosition {
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxSashWindow::wxSashWindow}
+\membersection{wxSashWindow::wxSashWindow}\label{wxsashwindowctor}
 
 \func{}{wxSashWindow}{\void}
 
@@ -91,7 +91,7 @@ should generate a default size for the window.}
 
 \docparam{name}{Window name.}
 
-\membersection{wxSashWindow::\destruct{wxSashWindow}}
+\membersection{wxSashWindow::\destruct{wxSashWindow}}\label{wxsashwindowdtor}
 
 \func{}{\destruct{wxSashWindow}}{\void}
 
@@ -131,7 +131,7 @@ Gets the minimum window size in the x direction.
 
 \membersection{wxSashWindow::GetMinimumSizeY}\label{wxsashwindowgetminimumsizey}
 
-\constfunc{int}{GetMinimumSizeY}{\param{int}{ min}}
+\constfunc{int}{GetMinimumSizeY}{\void}
 
 Gets the minimum window size in the y direction.
 
@@ -203,5 +203,5 @@ Call this function to give the sash a border, or remove the border.
 
 \wxheading{See also}
 
-\helpref{wxSashWindow::HashBorder}{wxsashwindowhasborder}
+\helpref{wxSashWindow::HasBorder}{wxsashwindowhasborder}
 
