X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cc81d32f2bf8c159f3b1bf6ddaf62e6d77720209..e39d30c05b9febb396cd9f133b9df7718142e299:/docs/latex/wx/filesysh.tex

diff --git a/docs/latex/wx/filesysh.tex b/docs/latex/wx/filesysh.tex
index 34ca77ed22..5e5dde0980 100644
--- a/docs/latex/wx/filesysh.tex
+++ b/docs/latex/wx/filesysh.tex
@@ -38,6 +38,10 @@ is always an {\bf absolute} path. You don't need to check the FS's current path.
 
 <wx/filesys.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxFileSystem}{wxfilesystem}, 
