X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cc81d32f2bf8c159f3b1bf6ddaf62e6d77720209..e39af974ef7846e26686ae39d74e4696c1fef0c3:/docs/latex/wx/sizer.tex

diff --git a/docs/latex/wx/sizer.tex b/docs/latex/wx/sizer.tex
index 4cd49b5708..6f0a7bc7e1 100644
--- a/docs/latex/wx/sizer.tex
+++ b/docs/latex/wx/sizer.tex
@@ -309,3 +309,5 @@ minimal size. For windows with managed scrollbars this will set them appropriate
 Shows or hides the {\it window}, {\it sizer}, or item at {\it index}.
 To make a sizer item disappear or reappear, use Show() followed by Layout().
 
+Note that this only works with wxBoxSizer and wxFlexGridSizer, since they
+are the only two sizer classes that can size rows/columns independently.
