X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cc81d32f2bf8c159f3b1bf6ddaf62e6d77720209..cf6ae2907c365869b10b61cbe3bde2768facd4d8:/docs/latex/wx/app.tex?ds=sidebyside

diff --git a/docs/latex/wx/app.tex b/docs/latex/wx/app.tex
index e54aa88be9..4908d31e6f 100644
--- a/docs/latex/wx/app.tex
+++ b/docs/latex/wx/app.tex
@@ -130,7 +130,7 @@ manner to refer to the application.
 
 \membersection{wxApp::GetExitOnFrameDelete}\label{wxappgetexitonframedelete}
 
-\constfunc{bool}{GetExitFrameOnDelete}{\void}
+\constfunc{bool}{GetExitOnFrameDelete}{\void}
 
 Returns true if the application will exit when the top-level window is deleted, false
 otherwise.
