X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cc81d32f2bf8c159f3b1bf6ddaf62e6d77720209..c50f92d08cc3633f8127931e7cf5d362ab8ac392:/docs/latex/wx/stream.tex

diff --git a/docs/latex/wx/stream.tex b/docs/latex/wx/stream.tex
index 4b2997f0eb..bdf3d7416b 100644
--- a/docs/latex/wx/stream.tex
+++ b/docs/latex/wx/stream.tex
@@ -250,14 +250,14 @@ Returns the current position (counted in bytes) in the stream buffer.
 
 \membersection{wxStreamBuffer::SetIntPosition}
 
-\func{void}{SetIntPosition}{\void}
+\func{void}{SetIntPosition}{\param{size\_t}{ pos}}
 
 Sets the current position (in bytes) in the stream buffer.
 
 \wxheading{Warning}
 
 Since it is a very low-level function, there is no check on the position:
-specify an invalid position can induce unexpected results.
+specifing an invalid position can induce unexpected results.
 
 \membersection{wxStreamBuffer::GetLastAccess}
 
