X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cc81d32f2bf8c159f3b1bf6ddaf62e6d77720209..c222be41e7169ab0c60f94ab250170f556339ce5:/docs/latex/wx/print.tex?ds=sidebyside

diff --git a/docs/latex/wx/print.tex b/docs/latex/wx/print.tex
index 6d88f898ae..e87acae4b5 100644
--- a/docs/latex/wx/print.tex
+++ b/docs/latex/wx/print.tex
@@ -119,7 +119,7 @@ printer should be used.
 
 \membersection{wxPrintData::GetQuality}\label{wxprintdatagetquality}
 
-\constfunc{wxPaperQuality}{GetQuality}{\void}
+\constfunc{wxPrintQuality}{GetQuality}{\void}
 
 Returns the current print quality. This can be a positive integer, denoting the number of dots per inch, or
 one of the following identifiers:
@@ -264,7 +264,7 @@ printer should be used.
 
 \membersection{wxPrintData::SetQuality}\label{wxprintdatasetquality}
 
-\func{void}{SetQuality}{\param{wxPaperQuality}{ quality}}
+\func{void}{SetQuality}{\param{wxPrintQuality}{ quality}}
 
 Sets the desired print quality. This can be a positive integer, denoting the number of dots per inch, or
 one of the following identifiers:
@@ -786,7 +786,7 @@ reference) and to return a tuple of four integers.
 }
 
 \perlnote{When this method is overridden in a derived class,
-it must not take any parameters, an return a 4-element list.
+it must not take any parameters, and returns a 4-element list.
 }
 
 \membersection{wxPrintout::GetPageSizeMM}\label{wxprintoutgetpagesizemm}
@@ -981,7 +981,7 @@ internally.
 
 \membersection{wxPrintPreview::GetCanvas}\label{wxprintpreviewgetcanvas}
 
-\func{wxWindow* }{GetCanvas}{\void}
+\func{wxPreviewCanvas* }{GetCanvas}{\void}
 
 Gets the preview window used for displaying the print preview image.
 
@@ -1067,7 +1067,7 @@ Renders a page into a wxMemoryDC. Used internally by wxPrintPreview.
 
 \membersection{wxPrintPreview::SetCanvas}\label{wxprintpreviewsetcanvas}
 
-\func{void}{SetCanvas}{\param{wxWindow* }{window}}
+\func{void}{SetCanvas}{\param{wxPreviewCanvas** }{window}}
 
 Sets the window to be used for displaying the print preview image.
 
