X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cc81d32f2bf8c159f3b1bf6ddaf62e6d77720209..b70b68a9ba62320a6a667f510b316219c7029d90:/docs/latex/wx/strmbase.tex?ds=inline

diff --git a/docs/latex/wx/strmbase.tex b/docs/latex/wx/strmbase.tex
index 3a18bd74a0..141374c28f 100644
--- a/docs/latex/wx/strmbase.tex
+++ b/docs/latex/wx/strmbase.tex
@@ -3,7 +3,7 @@
 % -----------------------------------------------------------------------------
 \section{\class{wxStreamBase}}\label{wxstreambase}
 
-This class is the base class of most stream related classes in wxWindows. It must
+This class is the base class of most stream related classes in wxWidgets. It must
 not be used directly.
 
 \wxheading{Derived from}
@@ -47,11 +47,11 @@ Returns true if no error occurred on the stream.
 
 \wxheading{See also}
 
-\helpref{LastError}{wxstreambaselasterror}
+\helpref{GetLastError}{wxstreambasegetlasterror}
 
-\membersection{wxStreamBase::LastError}\label{wxstreambaselasterror}
+\membersection{wxStreamBase::GetLastError}\label{wxstreambasegetlasterror}
 
-\constfunc{wxStreamError}{LastError}{\void}
+\constfunc{wxStreamError}{GetLastError}{\void}
 
 This function returns the last error.
 
@@ -100,9 +100,5 @@ the file.
 \wxheading{Warning}
 
 There are streams which do not have size by definition, such as socket streams.
-In that cases, GetSize returns an invalid size represented by
-
-\begin{verbatim}
-~(size_t)0
-\end{verbatim}
+In that cases, GetSize returns $0$ so you should always test its return value.
 
