X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cc81d32f2bf8c159f3b1bf6ddaf62e6d77720209..ab9d0a8ca3d306898d92960ecfaefb8c1191b18a:/docs/latex/wx/tempfile.tex?ds=sidebyside

diff --git a/docs/latex/wx/tempfile.tex b/docs/latex/wx/tempfile.tex
index 6aeddc5166..06a03a0d1e 100644
--- a/docs/latex/wx/tempfile.tex
+++ b/docs/latex/wx/tempfile.tex
@@ -91,7 +91,7 @@ Write to the file, return {\tt true} on success, {\tt false} on failure.
 
 Write to the file, return {\tt true} on success, {\tt false} on failure.
 
-The second argument is only meaningful in Unicode build of wxWindows when
+The second argument is only meaningful in Unicode build of wxWidgets when
 {\it conv} is used to convert {\it str} to multibyte representation.
 
 \membersection{wxTempFile::Commit}\label{wxtempfilecommit}
