X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cc81d32f2bf8c159f3b1bf6ddaf62e6d77720209..a4d6005e618d8d6ac3529f0cebe369ab76e5d71b:/docs/latex/wx/dllload.tex

diff --git a/docs/latex/wx/dllload.tex b/docs/latex/wx/dllload.tex
index 4c54aae8e6..c0f217dfd2 100644
--- a/docs/latex/wx/dllload.tex
+++ b/docs/latex/wx/dllload.tex
@@ -11,6 +11,11 @@
 
 \section{\class{wxDllLoader}}\label{wxdllloader}
 
+\textbf{Deprecation note: } This class is deprecated since version 2.4 and is
+not compiled in by default in version 2.6 and will be removed in 2.8. Please
+use \helpref{wxDynamicLibrary}{wxdynamiclibrary} instead.
+
+
 wxDllLoader is a class providing an interface similar to Unix's {\tt
 dlopen()}. It is used by the wxLibrary framework and manages the actual
 loading of shared libraries and the resolving of symbols in them. There are no
@@ -108,7 +113,7 @@ This function resolves a symbol in a loaded DLL, such as a variable or
 function name.
 
 Returned value will be {\tt NULL} if the symbol was not found in the DLL or if
-an error occured.
+an error occurred.
 
 \wxheading{Parameters}
 
