X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cc81d32f2bf8c159f3b1bf6ddaf62e6d77720209..90ab6483788d6c43c7647f5559b506cb132fdffa:/docs/latex/wx/checkbox.tex

diff --git a/docs/latex/wx/checkbox.tex b/docs/latex/wx/checkbox.tex
index b8d77fdc5e..9859e61809 100644
--- a/docs/latex/wx/checkbox.tex
+++ b/docs/latex/wx/checkbox.tex
@@ -1,7 +1,9 @@
 \section{\class{wxCheckBox}}\label{wxcheckbox}
 
-A checkbox is a labelled box which is either on (checkmark is visible)
-or off (no checkmark).
+A checkbox is a labelled box which by default is either on (checkmark is
+visible) or off (no checkmark). Optionally (when the wxCHK\_3STATE style flag
+is set) it can have a third state, called the mixed or undetermined state.
+Often this is used as a "Does Not Apply" state.
 
 \wxheading{Derived from}
 
@@ -14,9 +16,21 @@ or off (no checkmark).
 
 <wx/checkbox.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Window styles}
 
-There are no special styles for wxCheckBox.
+\twocolwidtha{7cm}
+\begin{twocollist}\itemsep=0pt
+\twocolitem{\windowstyle{wxCHK\_2STATE}}{Create a 2-state checkbox. This is the default.}
+\twocolitem{\windowstyle{wxCHK\_3STATE}}{Create a 3-state checkbox.
+Not implemented in wxMGL, wxOS2 and wxGTK built against GTK+ 1.2.}
+\twocolitem{\windowstyle{wxCHK\_ALLOW\_3RD\_STATE\_FOR\_USER}}{By default a user can't set a 3-state checkbox
+to the third state. It can only be done from code. Using this flags allows the user to set the checkbox to the third state by clicking. }
+\twocolitem{\windowstyle{wxALIGN\_RIGHT}}{Makes the text appear on the left of the checkbox.}
+\end{twocollist}
 
 See also \helpref{window styles overview}{windowstyles}.
 
@@ -34,7 +48,7 @@ when the checkbox is clicked.}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxCheckBox::wxCheckBox}\label{wxcheckboxconstr}
+\membersection{wxCheckBox::wxCheckBox}\label{wxcheckboxctor}
 
 \func{}{wxCheckBox}{\void}
 
@@ -69,7 +83,7 @@ Constructor, creating and showing a checkbox.
 
 \helpref{wxCheckBox::Create}{wxcheckboxcreate}, \helpref{wxValidator}{wxvalidator}
 
-\membersection{wxCheckBox::\destruct{wxCheckBox}}
+\membersection{wxCheckBox::\destruct{wxCheckBox}}\label{wxcheckboxdtor}
 
 \func{}{\destruct{wxCheckBox}}{\void}
 
@@ -82,18 +96,51 @@ Destructor, destroying the checkbox.
 \param{const wxSize\& }{size = wxDefaultSize}, \param{long}{ style = 0},\rtfsp
 \param{const wxValidator\& }{val}, \param{const wxString\& }{name = ``checkBox"}}
 
-Creates the checkbox for two-step construction. See \helpref{wxCheckBox::wxCheckBox}{wxcheckboxconstr}\rtfsp
+Creates the checkbox for two-step construction. See \helpref{wxCheckBox::wxCheckBox}{wxcheckboxctor}\rtfsp
 for details.
 
 \membersection{wxCheckBox::GetValue}\label{wxcheckboxgetvalue}
 
 \constfunc{bool}{GetValue}{\void}
 
-Gets the state of the checkbox.
+Gets the state of a 2-state checkbox.
+
+\wxheading{Return value}
+
+Returns \true if it is checked, \false otherwise.
+
+\membersection{wxCheckBox::Get3StateValue}\label{wxcheckboxgetthreestatevalue}
+
+\constfunc{wxCheckBoxState}{Get3StateValue}{\void}
+
+Gets the state of a 3-state checkbox.
+
+\wxheading{Return value}
+
+Returns wxCHK\_UNCHECKED when the checkbox is unchecked, wxCHK\_CHECKED
+ when it is checked and wxCHK\_UNDETERMINED when it's in the undetermined
+state. Asserts when the function is used with a 2-state checkbox.
+
+\membersection{wxCheckBox::Is3rdStateAllowedForUser}\label{wxcheckboxis3rdstateallowedforuser}
+
+\constfunc{bool}{Is3rdStateAllowedForUser}{\void}
+
+Returns whether or not the user can set the checkbox to the third state.
+
+\wxheading{Return value}
+
+Returns \true if the user can set the third state of this checkbox, \false if it can only be set
+programmatically or if it's a 2-state checkbox.
+
+\membersection{wxCheckBox::Is3State}\label{wxcheckboxis3state}
+
+\constfunc{bool}{Is3State}{\void}
+
+Returns whether or not the checkbox is a 3-state checkbox.
 
 \wxheading{Return value}
 
-Returns {\tt true} if it is checked, {\tt false} otherwise.
+Returns \true if this checkbox is a 3-state checkbox, \false if it's a 2-state checkbox.
 
 \membersection{wxCheckBox::IsChecked}\label{wxcheckboxischecked}
 
@@ -101,16 +148,28 @@ Returns {\tt true} if it is checked, {\tt false} otherwise.
 
 This is just a maybe more readable synonym for 
 \helpref{GetValue}{wxcheckboxgetvalue}: just as the latter, it returns 
-{\tt true} if the checkbox is checked and {\tt false} otherwise.
+\true if the checkbox is checked and \false otherwise.
 
 \membersection{wxCheckBox::SetValue}\label{wxcheckboxsetvalue}
 
-\func{void}{SetValue}{\param{const bool}{ state}}
+\func{void}{SetValue}{\param{bool}{ state}}
 
 Sets the checkbox to the given state. This does not cause a
 wxEVT\_COMMAND\_CHECKBOX\_CLICKED event to get emitted.
 
 \wxheading{Parameters}
 
-\docparam{state}{If {\tt true}, the check is on, otherwise it is off.}
+\docparam{state}{If \true, the check is on, otherwise it is off.}
+
+\membersection{wxCheckBox::Set3StateValue}\label{wxcheckboxset3statevalue}
+
+\func{void}{Set3StateValue}{\param{const wxCheckBoxState}{ state}}
+
+Sets the checkbox to the given state. This does not cause a
+wxEVT\_COMMAND\_CHECKBOX\_CLICKED event to get emitted.
+
+\wxheading{Parameters}
 
+\docparam{state}{Can be one of: wxCHK\_UNCHECKED (Check is off), wxCHK\_CHECKED
+ (Check is on) or wxCHK\_UNDETERMINED (Check is mixed). Asserts when the checkbox
+ is a 2-state checkbox and setting the state to wxCHK\_UNDETERMINED.}
