X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cc81d32f2bf8c159f3b1bf6ddaf62e6d77720209..8d99dec09b29b5bce370b087cc0f35e2be9cb39a:/docs/latex/wx/inputstr.tex

diff --git a/docs/latex/wx/inputstr.tex b/docs/latex/wx/inputstr.tex
index a46d41fa39..daf42acc31 100644
--- a/docs/latex/wx/inputstr.tex
+++ b/docs/latex/wx/inputstr.tex
@@ -79,7 +79,7 @@ The data is read until an error is raised by one of the two streams.
 This function returns a reference on the current object, so the user can test
 any states of the stream right away.
 
-\membersection{wxInputStream::SeekI}
+\membersection{wxInputStream::SeekI}\label{wxinputstreamseeki}
 
 \func{off\_t}{SeekI}{\param{off\_t}{ pos}, \param{wxSeekMode}{ mode = wxFromStart}}
 
