X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cc81d32f2bf8c159f3b1bf6ddaf62e6d77720209..8c8d66c5f06ed3b4f7b2d14966bf84333f60606f:/docs/latex/wx/progdlg.tex

diff --git a/docs/latex/wx/progdlg.tex b/docs/latex/wx/progdlg.tex
index fc7f5a5fe5..0bdf7f669b 100644
--- a/docs/latex/wx/progdlg.tex
+++ b/docs/latex/wx/progdlg.tex
@@ -16,7 +16,7 @@ progress bar. Optionally, it can display an ABORT button.
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxProgressDialog::wxProgressDialog}\label{wxprogressdialogconstr}
+\membersection{wxProgressDialog::wxProgressDialog}\label{wxprogressdialogctor}
 
 \func{}{wxProgressDialog}{\param{const wxString\& }{title},
  \param{const wxString\& }{message},\rtfsp
@@ -38,8 +38,6 @@ window only.
 
 \docparam{parent}{Parent window.}
 
-\docparam{message}{Message to show on the dialog.}
-
 \docparam{style}{The dialog style. This is the combination of the following
 bitmask constants defined in wx/defs.h:
 
@@ -62,36 +60,38 @@ reached.}
 \end{twocollist}%
 }
 
-\membersection{wxProgressDialog::\destruct{wxProgressDialog}}
+\membersection{wxProgressDialog::\destruct{wxProgressDialog}}\label{wxprogressdialogdtor}
 
 \func{}{\destruct{wxMessageDialog}}{\void}
 
 Destructor. Deletes the dialog and enables all top level windows.
 
+\membersection{wxProgressDialog::Resume}\label{wxprogressdialogresume}
+
+\func{void}{Resume}{\void}
+
+Can be used to continue with the dialog, after the user had chosen
+ABORT.
+
 \membersection{wxProgressDialog::Update}\label{wxprogressdialogupdate}
 
-\func{bool}{Update}{
-  \param{int }{value = -1},\rtfsp
-  \param{const char * }{newmsg = NULL},  }
+\func{virtual bool}{Update}{
+  \param{int }{value},\rtfsp
+  \param{const wxString\& }{newmsg = ""}}
 
 Updates the dialog, setting the progress bar to the new value and, if
-given changes the message above it. Returns true if the ABORT button 
-has \emph{not} been pressed.
+given changes the message above it. Returns true unless the Cancel button
+has been pressed.
 
 If false is returned, the application can either immediately destroy the dialog
 or ask the user for the confirmation and if the abort is not confirmed the
 dialog may be resumed with \helpref{Resume}{wxprogressdialogresume} function.
 
-\docparam{value}{The new value of the progress meter. It must be strictly less
-than the maximum value given to the constructor (i.e., as usual in C, the
-index runs from $0$ to $maximum-1$).}
-\docparam{newmsg}{The new messages for the progress dialog text, if none is
-given the message is not changed.}
-
-\membersection{wxProgressDialog::Resume}\label{wxprogressdialogresume}
-
-\func{void}{Resume}{\void}
+\wxheading{Parameters}
 
-Can be used to continue with the dialog, after the user had chosen
-ABORT.
+\docparam{value}{The new value of the progress meter. It should be less than or
+equal to the maximum value given to the constructor and the dialog is closed if
+it is equal to the maximum.}
+\docparam{newmsg}{The new messages for the progress dialog text, if it is
+empty (which is the default) the message is not changed.}
 
