X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cc81d32f2bf8c159f3b1bf6ddaf62e6d77720209..804eeca5d59fc4d3822b719dee61a9d491e6bcfc:/docs/latex/wx/dragimag.tex?ds=sidebyside

diff --git a/docs/latex/wx/dragimag.tex b/docs/latex/wx/dragimag.tex
index e74b6db01d..633e80e68e 100644
--- a/docs/latex/wx/dragimag.tex
+++ b/docs/latex/wx/dragimag.tex
@@ -3,7 +3,7 @@
 This class is used when you wish to drag an object on the screen,
 and a simple cursor is not enough.
 
-On Windows, the WIN32 API is used to do achieve smooth dragging. On other platforms,
+On Windows, the Win32 API is used to achieve smooth dragging. On other platforms,
 wxGenericDragImage is used. Applications may also prefer to use
 wxGenericDragImage on Windows, too.
 
@@ -44,6 +44,10 @@ Please see {\tt samples/dragimag} for an example.
 
 <wx/dragimag.h>\\
 <wx/generic/dragimgg.h>
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
