X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cc81d32f2bf8c159f3b1bf6ddaf62e6d77720209..75736a9c818f10e49b51506d967759fbecb4fa66:/docs/latex/wx/plotwindow.tex

diff --git a/docs/latex/wx/plotwindow.tex b/docs/latex/wx/plotwindow.tex
index f8c08655c0..c17b876bdb 100644
--- a/docs/latex/wx/plotwindow.tex
+++ b/docs/latex/wx/plotwindow.tex
@@ -76,15 +76,15 @@ Returns number of curves.
 
 Get the nth curve.
 
-\membersection{wxPlotWindow::SetCurrent}\label{wxplotwindowsetcurrent}
+\membersection{wxPlotWindow::SetCurrentCurve}\label{wxplotwindowsetcurrentcurve}
 
-\func{void}{SetCurrent}{\param{wxPlotCurve* }{current}}
+\func{void}{SetCurrentCurve}{\param{wxPlotCurve* }{current}}
 
 Make one curve the current curve. This will emit a wxPlotEvent.
 
-\membersection{wxPlotWindow::GetCurrent}\label{wxplotwindowgetcurrent}
+\membersection{wxPlotWindow::GetCurrentCurve}\label{wxplotwindowgetcurrentcurve}
 
-\func{wxPlotCurve*}{GetCurrent}{\void}
+\func{wxPlotCurve*}{GetCurrentCurve}{\void}
 
 Returns a pointer to the current curve, or NULL.
 
