X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cc81d32f2bf8c159f3b1bf6ddaf62e6d77720209..749bb9f1291c3c967a25cbbd9aed98a89f7e1511:/docs/latex/wx/stream.tex

diff --git a/docs/latex/wx/stream.tex b/docs/latex/wx/stream.tex
index 4b2997f0eb..d82bbf9b91 100644
--- a/docs/latex/wx/stream.tex
+++ b/docs/latex/wx/stream.tex
@@ -91,7 +91,7 @@ accordingly until all requested data is read.
 
 It returns the size of the data read. If the returned size is different of the specified 
 {\it size}, an error has occurred and should be tested using 
-\helpref{LastError}{wxstreambaselasterror}.
+\helpref{GetLastError}{wxstreambasegetlasterror}.
 
 \func{size\_t}{Read}{\param{wxStreamBuffer *}{buffer}}
 
@@ -250,14 +250,14 @@ Returns the current position (counted in bytes) in the stream buffer.
 
 \membersection{wxStreamBuffer::SetIntPosition}
 
-\func{void}{SetIntPosition}{\void}
+\func{void}{SetIntPosition}{\param{size\_t}{ pos}}
 
 Sets the current position (in bytes) in the stream buffer.
 
 \wxheading{Warning}
 
 Since it is a very low-level function, there is no check on the position:
-specify an invalid position can induce unexpected results.
+specifing an invalid position can induce unexpected results.
 
 \membersection{wxStreamBuffer::GetLastAccess}
 
