X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cc81d32f2bf8c159f3b1bf6ddaf62e6d77720209..68d411dc5724b9284455a31ef8a8d6d99c18d224:/docs/latex/wx/cmdlpars.tex

diff --git a/docs/latex/wx/cmdlpars.tex b/docs/latex/wx/cmdlpars.tex
index 8cbd7ccd89..7c708fccf0 100644
--- a/docs/latex/wx/cmdlpars.tex
+++ b/docs/latex/wx/cmdlpars.tex
@@ -6,7 +6,7 @@
 %% Created:     27.03.00
 %% RCS-ID:      $Id$
 %% Copyright:   (c) Vadim Zeitlin
-%% License:     wxWindows license
+%% License:     wxWidgets license
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
 
 \section{\class{wxCmdLineParser}}\label{wxcmdlineparser}
@@ -215,7 +215,7 @@ terminate after this) or a positive number if there was an error during the
 command line parsing.
 
 In the latter case, the appropriate error message and usage information are
-logged by wxCmdLineParser itself using the standard wxWindows logging functions.
+logged by wxCmdLineParser itself using the standard wxWidgets logging functions.
 
 \membersection{Getting results}\label{wxcmdlineparsergettingresults}
 
