X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cc81d32f2bf8c159f3b1bf6ddaf62e6d77720209..6444e22daa9f3ff357ea57d3f18fb92fec24d003:/docs/latex/wx/wizard.tex

diff --git a/docs/latex/wx/wizard.tex b/docs/latex/wx/wizard.tex
index 034da96e51..6ebb199d02 100644
--- a/docs/latex/wx/wizard.tex
+++ b/docs/latex/wx/wizard.tex
@@ -137,7 +137,7 @@ by default.}
 
 \membersection{wxWizard::FitToPage}\label{wxwizardfittopage}
 
-\func{void}{FittoPage}{\param{const wxWizardPage* }{firstPage}}
+\func{void}{FitToPage}{\param{const wxWizardPage* }{firstPage}}
 
 Sets the page size to be big enough for all the pages accessible via the
 given {\it firstPage}, i.e. this page, its next page and so on.
