X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cc81d32f2bf8c159f3b1bf6ddaf62e6d77720209..26b0b998042f7a87ebbf040c071b9748574290ba:/docs/latex/wx/docmanag.tex

diff --git a/docs/latex/wx/docmanag.tex b/docs/latex/wx/docmanag.tex
index 50b9e0da96..83b22df2e5 100644
--- a/docs/latex/wx/docmanag.tex
+++ b/docs/latex/wx/docmanag.tex
@@ -246,9 +246,9 @@ Returns the directory last selected by the user when opening a file. Initially e
 
 Returns the number of documents that can be open simultaneously.
 
-\membersection{wxDocManager::GetNoHistoryFiles}
+\membersection{wxDocManager::GetHistoryFilesCount}
 
-\func{int}{GetNoHistoryFiles}{\void}
+\func{size\_t}{GetHistoryFilesCount}{\void}
 
 Returns the number of files currently stored in the file history.
 
