X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cc81d32f2bf8c159f3b1bf6ddaf62e6d77720209..1c0f361be288df133c766e04cc857b3e4682b31a:/docs/latex/wx/ffilestr.tex

diff --git a/docs/latex/wx/ffilestr.tex b/docs/latex/wx/ffilestr.tex
index d686281db8..c413c1b332 100644
--- a/docs/latex/wx/ffilestr.tex
+++ b/docs/latex/wx/ffilestr.tex
@@ -15,6 +15,9 @@ reached. This is documented in \helpref{wxFile::Eof}{wxfileeof} and
 classes reflects this difference, i.e. wxFileInputStream will report
 wxSTREAM\_EOF after having read the last byte whereas wxFFileInputStream
 will report wxSTREAM\_EOF after trying to read {\it past} the last byte.
+Related to EOF behavior, note that \helpref{SeekI()}{wxinputstreamseeki} 
+can seek beyond the end of the stream (file) and will thus not return 
+{\it wxInvalidOffset} for that.
 
 \wxheading{Derived from}
 
@@ -76,6 +79,9 @@ reached. This is documented in \helpref{wxFile::Eof}{wxfileeof} and
 classes reflects this difference, i.e. wxFileInputStream will report
 wxSTREAM\_EOF after having read the last byte whereas wxFFileInputStream
 will report wxSTREAM\_EOF after trying to read {\it past} the last byte.
+Related to EOF behavior, note that \helpref{SeekO()}{wxoutputstreamseeko} 
+can seek beyond the end of the stream (file) and will thus not return 
+{\it wxInvalidOffset} for that.
 
 \wxheading{Derived from}
 
