X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/cc81d32f2bf8c159f3b1bf6ddaf62e6d77720209..0032ddbb32de472a9ed5e96879b1a23d70df023a:/docs/latex/wx/datistrm.tex?ds=inline

diff --git a/docs/latex/wx/datistrm.tex b/docs/latex/wx/datistrm.tex
index 158ffffb2e..1cec62695d 100644
--- a/docs/latex/wx/datistrm.tex
+++ b/docs/latex/wx/datistrm.tex
@@ -78,30 +78,55 @@ big-endian order).
 
 Reads a single byte from the stream.
 
+\func{void}{Read8}{\param{wxUint8 *}{buffer}, \param{size\_t }{size}}
+
+Reads bytes from the stream in a specified buffer. The amount of
+bytes to read is specified by the {\it size} variable.
+
 \membersection{wxDataInputStream::Read16}
 
 \func{wxUint16}{Read16}{\void}
 
 Reads a 16 bit unsigned integer from the stream.
 
+\func{void}{Read16}{\param{wxUint16 *}{buffer}, \param{size\_t }{size}}
+
+Reads 16 bit unsigned integers from the stream in a specified buffer. the
+amount of 16 bit unsigned integer to read is specified by the {\it size} variable.
+
 \membersection{wxDataInputStream::Read32}
 
 \func{wxUint32}{Read32}{\void}
 
 Reads a 32 bit unsigned integer from the stream.
 
+\func{void}{Read32}{\param{wxUint32 *}{buffer}, \param{size\_t }{size}}
+
+Reads 32 bit unsigned integers from the stream in a specified buffer. the amount of
+32 bit unsigned integer to read is specified by the {\it size} variable.
+
 \membersection{wxDataInputStream::Read64}
 
 \func{wxUint64}{Read64}{\void}
 
 Reads a 64 bit unsigned integer from the stream.
 
+\func{void}{Read64}{\param{wxUint64 *}{buffer}, \param{size\_t }{size}}
+
+Reads 64 bit unsigned integers from the stream in a specified buffer. the amount of
+64 bit unsigned integer to read is specified by the {\it size} variable.
+
 \membersection{wxDataInputStream::ReadDouble}
 
 \func{double}{ReadDouble}{\void}
 
 Reads a double (IEEE encoded) from the stream.
 
+\func{void}{ReadDouble}{\param{double *}{buffer}, \param{size\_t }{size}}
+
+Reads double data (IEEE encoded) from the stream in a specified buffer. the amount of
+double to read is specified by the {\it size} variable.
+
 \membersection{wxDataInputStream::ReadString}\label{wxdatainputstreamreadstring}
 
 \func{wxString}{ReadString}{\void}
