X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/c9c537e6b06e7ca0160de52b7a91901aef0381e0..e9a4b51d276200acbb1dd22633602585fd30e9a1:/docs/latex/wx/thread.tex

diff --git a/docs/latex/wx/thread.tex b/docs/latex/wx/thread.tex
index 12f9020b74..7a8c8ee32c 100644
--- a/docs/latex/wx/thread.tex
+++ b/docs/latex/wx/thread.tex
@@ -471,3 +471,4 @@ You can only Wait() for joinable (not detached) threads.
 This function can only be called from another thread context.
 
 See \helpref{wxThread deletion}{deletionwxthread} for a broader explanation of this routine.
+
