X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/c9c537e6b06e7ca0160de52b7a91901aef0381e0..245b9db51823e59bd61f0d7c0c69b419495cf0b7:/docs/latex/wx/thread.tex

diff --git a/docs/latex/wx/thread.tex b/docs/latex/wx/thread.tex
index 12f9020b74..73ff763528 100644
--- a/docs/latex/wx/thread.tex
+++ b/docs/latex/wx/thread.tex
@@ -19,6 +19,10 @@ None.
 
 <wx/thread.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxMutex}{wxmutex}, \helpref{wxCondition}{wxcondition}, \helpref{wxCriticalSection}{wxcriticalsection}
@@ -461,13 +465,15 @@ See also \helpref{Sleep()}{wxthreadsleep}.
 
 \constfunc{ExitCode}{Wait}{\void}
 
-Gracefully terminates a joinable thread, either when the thread calls 
-\helpref{TestDestroy}{wxthreadtestdestroy} or finished processing, and 
-returns the value the thread returned from 
-\helpref{wxThread::Entry}{wxthreadentry} or {\tt (ExitCode)-1} on error. 
+Waits for a joinable thread to terminate and returns the value the thread
+returned from \helpref{wxThread::Entry}{wxthreadentry} or {\tt (ExitCode)-1} on
+error. Notice that, unlike \helpref{Delete}{wxthreaddelete} doesn't cancel the
+thread in any way so the caller waits for as long as it takes to the thread to
+exit.
 
 You can only Wait() for joinable (not detached) threads.
 
 This function can only be called from another thread context.
 
 See \helpref{wxThread deletion}{deletionwxthread} for a broader explanation of this routine.
+
