X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/c91108763b1621be54af24e24b2fab590db87325..f925f24de8a4e6aa116efed61ab77ec08b686c67:/docs/latex/wx/settings.tex?ds=sidebyside

diff --git a/docs/latex/wx/settings.tex b/docs/latex/wx/settings.tex
index 39dede3d6c..88474c6b89 100644
--- a/docs/latex/wx/settings.tex
+++ b/docs/latex/wx/settings.tex
@@ -69,7 +69,7 @@ Returns a system colour.
 \end{twocollist}
 
 \pythonnote{This static method is implemented in Python as a
-standalone function named {\tt wxSystemSettings_GetSystemColour}}
+standalone function named {\tt wxSystemSettings\_GetSystemColour}}
 
 \membersection{wxSystemSettings::GetSystemFont}\label{wxsystemsettingsgetsystemfont}
 
@@ -91,7 +91,7 @@ Not available in versions of Windows earlier than Windows 95 or Windows NT 4.0.}
 \end{twocollist}
 
 \pythonnote{This static method is implemented in Python as a
-standalone function named {\tt wxSystemSettings_GetSystemFont}}
+standalone function named {\tt wxSystemSettings\_GetSystemFont}}
 
 \membersection{wxSystemSettings::GetSystemMetric}\label{wxsystemsettingsgetsystemmetric}
 
@@ -150,5 +150,5 @@ where it would otherwise present the information only in audible form; zero othe
 \end{twocollist}
 
 \pythonnote{This static method is implemented in Python as a
-standalone function named {\tt wxSystemSettings_GetSystemMetric}}
+standalone function named {\tt wxSystemSettings\_GetSystemMetric}}
 
