X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/c91108763b1621be54af24e24b2fab590db87325..94e2ed3b8db0220160c0b939782cd46914ec073a:/docs/latex/wx/validatr.tex

diff --git a/docs/latex/wx/validatr.tex b/docs/latex/wx/validatr.tex
index cb23b95288..765c4d2084 100644
--- a/docs/latex/wx/validatr.tex
+++ b/docs/latex/wx/validatr.tex
@@ -33,11 +33,10 @@ capabilities for the various virtual methods.}
 
 \wxheading{See also}
 
-\helpref{Validator overview}{validatoroverview},
-\helpref{wxTextValidator}{wxtextvalidator},
+\helpref{Validator overview}{validatoroverview}, 
+\helpref{wxTextValidator}{wxtextvalidator}, 
 \helpref{wxGenericValidator}{wxgenericvalidator},
 
-
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 \membersection{wxValidator::wxValidator}\label{wxvalidatorconstr}
@@ -54,7 +53,7 @@ Destructor.
 
 \membersection{wxValidator::Clone}\label{wxvalidatorclone}
 
-\constfunc{virtual wxValidator*}{Clone}{\void}
+\constfunc{virtual wxObject*}{Clone}{\void}
 
 All validator classes must implement the {\bf Clone} function, which returns
 an identical copy of itself. This is because validators are passed to control
@@ -105,4 +104,3 @@ transferred to the window. Return FALSE if there is a problem.
 This overridable function is called when the value in the associated window must be validated.
 Return FALSE if the value in the window is not valid; you may pop up an error dialog.
 
-
