X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/c91108763b1621be54af24e24b2fab590db87325..21dc4be5d27fd73cda55795ab9d1e7e02b494c46:/docs/latex/wx/validatr.tex?ds=sidebyside

diff --git a/docs/latex/wx/validatr.tex b/docs/latex/wx/validatr.tex
index cb23b95288..aa21a3017a 100644
--- a/docs/latex/wx/validatr.tex
+++ b/docs/latex/wx/validatr.tex
@@ -33,20 +33,19 @@ capabilities for the various virtual methods.}
 
 \wxheading{See also}
 
-\helpref{Validator overview}{validatoroverview},
-\helpref{wxTextValidator}{wxtextvalidator},
+\helpref{Validator overview}{validatoroverview}, 
+\helpref{wxTextValidator}{wxtextvalidator}, 
 \helpref{wxGenericValidator}{wxgenericvalidator},
 
-
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxValidator::wxValidator}\label{wxvalidatorconstr}
+\membersection{wxValidator::wxValidator}\label{wxvalidatorctor}
 
 \func{}{wxValidator}{\void}
 
 Constructor.
 
-\membersection{wxValidator::\destruct{wxValidator}}
+\membersection{wxValidator::\destruct{wxValidator}}\label{wxvalidatordtor}
 
 \func{}{\destruct{wxValidator}}{\void}
 
@@ -54,7 +53,7 @@ Destructor.
 
 \membersection{wxValidator::Clone}\label{wxvalidatorclone}
 
-\constfunc{virtual wxValidator*}{Clone}{\void}
+\constfunc{virtual wxObject*}{Clone}{\void}
 
 All validator classes must implement the {\bf Clone} function, which returns
 an identical copy of itself. This is because validators are passed to control
@@ -71,9 +70,9 @@ This base function returns NULL.
 
 Returns the window associated with the validator.
 
-\membersection{wxValidator::SetBellOnError}{wxvalidatorsetbellonerror}
+\membersection{wxValidator::SetBellOnError}\label{wxvalidatorsetbellonerror}
 
-\func{void}{SetBellOnError}{\param{bool}{ doIt = TRUE}}
+\func{void}{SetBellOnError}{\param{bool}{ doIt = true}}
 
 This functions switches on or turns off the error sound produced by the
 validators if an invalid key is pressed.
@@ -89,20 +88,19 @@ Associates a window with the validator.
 \func{virtual bool}{TransferToWindow}{}
 
 This overridable function is called when the value in the window must be
-transferred to the validator. Return FALSE if there is a problem.
+transferred to the validator. Return false if there is a problem.
 
 \membersection{wxValidator::TransferToWindow}\label{wxvalidatortransfertowindow}
 
 \func{virtual bool}{TransferToWindow}{}
 
 This overridable function is called when the value associated with the validator must be
-transferred to the window. Return FALSE if there is a problem.
+transferred to the window. Return false if there is a problem.
 
 \membersection{wxValidator::Validate}\label{wxvalidatorvalidate}
 
 \func{virtual bool}{Validate}{\param{wxWindow*}{ parent}}
 
 This overridable function is called when the value in the associated window must be validated.
-Return FALSE if the value in the window is not valid; you may pop up an error dialog.
-
+Return false if the value in the window is not valid; you may pop up an error dialog.
 
