X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/c89165a82daea967ec79e528fd08bf7440bbd4ec..c6c825d8dd7e956c0561b769588e44e54c2c0222:/docs/latex/wx/statline.tex?ds=sidebyside

diff --git a/docs/latex/wx/statline.tex b/docs/latex/wx/statline.tex
index 7e6a82fb89..3fe2b22681 100644
--- a/docs/latex/wx/statline.tex
+++ b/docs/latex/wx/statline.tex
@@ -34,7 +34,7 @@ groups of controls. The line may be only vertical or horizontal.
 
 Default constructor.
 
-\func{}{wxStaticLine}{\param{wxWindow* }{parent}, \param{wxWindowID }{id}, \param{const wxString\& }{label},\rtfsp
+\func{}{wxStaticLine}{\param{wxWindow* }{parent}, \param{wxWindowID }{id},\rtfsp
 \param{const wxPoint\&}{ pos = wxDefaultPosition}, \param{const wxSize\& }{size = wxDefaultSize},\rtfsp
 \param{long}{ style = wxLI\_HORIZONTAL}, \param{const wxString\& }{name = ``staticLine"}}
 
@@ -61,7 +61,7 @@ whether the line if horizontal or vertical) is ignored.}
 
 \membersection{wxStaticLine::Create}\label{wxstaticlinecreate}
 
-\func{bool}{Create}{\param{wxWindow* }{parent}, \param{wxWindowID }{id}, \param{const wxString\& }{label},\rtfsp
+\func{bool}{Create}{\param{wxWindow* }{parent}, \param{wxWindowID }{id},\rtfsp
 \param{const wxPoint\&}{ pos = wxDefaultPosition}, \param{const wxSize\& }{size = wxDefaultSize},\rtfsp
 \param{long}{ style = 0}, \param{const wxString\& }{name = ``staticLine"}}
 
@@ -72,12 +72,13 @@ for further details.
 
 \constfunc{bool}{IsVertical}{\void}
 
-Returns TRUE if the line is vertical, FALSE if horizontal.
+Returns true if the line is vertical, false if horizontal.
 
 \membersection{wxStaticLine::GetDefaultSize}\label{wxstaticlinegetdefaultsize}
 
 \func{int}{GetDefaultSize}{\void}
 
-This static function returns the size which will be given to the "lesser"
+This static function returns the size which will be given to the smaller
 dimension of the static line, i.e. its height for a horizontal line or its
 width for a vertical one.
+
