X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/c89165a82daea967ec79e528fd08bf7440bbd4ec..b5a4a47df5ad0d52cac80946bdd0685d34749fc4:/docs/latex/wx/statline.tex

diff --git a/docs/latex/wx/statline.tex b/docs/latex/wx/statline.tex
index 7e6a82fb89..3c506f9e72 100644
--- a/docs/latex/wx/statline.tex
+++ b/docs/latex/wx/statline.tex
@@ -81,3 +81,4 @@ Returns TRUE if the line is vertical, FALSE if horizontal.
 This static function returns the size which will be given to the "lesser"
 dimension of the static line, i.e. its height for a horizontal line or its
 width for a vertical one.
+
