X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/c7f49969d61742050e2caaf27528bdb96ffc8365..41bf0eb335ef9941b0aa87f8d5d040cd86620755:/docs/latex/wx/stream.tex?ds=sidebyside

diff --git a/docs/latex/wx/stream.tex b/docs/latex/wx/stream.tex
index 69395451d0..ac3eff3613 100644
--- a/docs/latex/wx/stream.tex
+++ b/docs/latex/wx/stream.tex
@@ -4,6 +4,10 @@
 
 None
 
+\wxheading{Include files}
+
+<wx/stream.h>
+
 \wxheading{See also}
 
 \helpref{wxStreamBase}{wxstreambase}
@@ -128,25 +132,6 @@ are cached in a buffer before being sent in one block to the stream.
 
 See \helpref{Read}{wxstreambufferread}.
 
-\membersection{wxStreamBuffer::WriteBack}\label{wxstreambufferwriteback}
-
-\func{size\_t}{WriteBack}{\param{const char*}{ buffer}, \param{size\_t}{ size}}
-
-This function is only useful in \it{read} mode. It is the manager of the "Write-Back"
-buffer. This buffer acts like a temporary buffer where datas which has to be 
-read during the next read IO call are put. This is useful when you get a big
-block of data which you didn't want to read: you can replace them at the top
-of the input queue by this way.
-
-\wxheading{Return value}
-
-Returns the amount of bytes saved in the Write-Back buffer.
-
-\func{size\_t}{WriteBack}{\param{char }{c}}
-
-This function acts like the previous one except that it takes only one
-character: it is sometimes shorter to use than the generic function.
-
 \membersection{wxStreamBuffer::GetChar}
 
 \func{char}{GetChar}{\void}
