X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/c7d9131ae533ccecb10f4dcebcb820a7e062a11c..df83b840bbf6441a0166848d49a093557e562926:/docs/latex/wx/outptstr.tex

diff --git a/docs/latex/wx/outptstr.tex b/docs/latex/wx/outptstr.tex
index af0d1c54d0..1c61a7c606 100644
--- a/docs/latex/wx/outptstr.tex
+++ b/docs/latex/wx/outptstr.tex
@@ -3,6 +3,8 @@
 % -----------------------------------------------------------------------------
 \section{\class{wxOutputStream}}\label{wxoutputstream}
 
+wxOutputStream is an abstract base class which may not be used directly.
+
 \wxheading{Derived from}
 
 \helpref{wxStreamBase}{wxstreambase}
@@ -11,50 +13,90 @@
 
 <wx/stream.h>
 
+\latexignore{\rtfignore{\wxheading{Members}}}
+
 % -----------
 % ctor & dtor
 % -----------
-\membersection{wxOutputStream::wxOutputStream}
+
+\membersection{wxOutputStream::wxOutputStream}\label{wxoutputstreamctor}
 
 \func{}{wxOutputStream}{\void}
 
 Creates a dummy wxOutputStream object.
 
-\membersection{wxOutputStream::\destruct{wxOutputStream}}
+
+\membersection{wxOutputStream::\destruct{wxOutputStream}}\label{wxoutputstreamdtor}
 
 \func{}{\destruct{wxOutputStream}}{\void}
 
 Destructor.
 
-\membersection{wxOutputStream::LastWrite}
+
+\membersection{wxOutputStream::Close}\label{wxoutputstreamclose}
+
+\func{bool}{Close}{\void}
+
+Closes the stream, returning {\tt false} if an error occurs. The
+stream is closed implicitly in the destructor if Close() is not
+called explicitly.
+
+If this stream wraps another stream or some other resource such
+as a file, then the underlying resource is closed too if it is owned
+by this stream, or left open otherwise.
+
+
+\membersection{wxOutputStream::LastWrite}\label{wxoutputstreamlastwrite}
 
 \constfunc{size\_t}{LastWrite}{\void}
 
-\membersection{wxOutputStream::PutC}
+Returns the number of bytes written during the last 
+\helpref{Write()}{wxoutputstreamwrite}. It may return $0$ even if there is no
+error on the stream if it is only temporarily impossible to write to it.
+
+
+\membersection{wxOutputStream::PutC}\label{wxoutputstreamputc}
 
 \func{void}{PutC}{\param{char}{ c}}
 
 Puts the specified character in the output queue and increments the
 stream position.
 
-\membersection{wxOutputStream::SeekO}
 
-\func{off\_t}{SeekO}{\param{off\_t}{ pos}, \param{wxSeekMode}{ mode}}
+\membersection{wxOutputStream::SeekO}\label{wxoutputstreamseeko}
+
+\func{off\_t}{SeekO}{\param{off\_t}{ pos}, \param{wxSeekMode}{ mode = wxFromStart}}
 
 Changes the stream current position.
 
-\membersection{wxOutputStream::TellO}
+\wxheading{Parameters}
+
+\docparam{pos}{Offset to seek to.}
+
+\docparam{mode}{One of {\bf wxFromStart}, {\bf wxFromEnd}, {\bf wxFromCurrent}.}
+
+\wxheading{Return value}
+
+The new stream position or wxInvalidOffset on error.
+
+
+\membersection{wxOutputStream::TellO}\label{wxoutputstreamtello}
 
 \constfunc{off\_t}{TellO}{\void}
 
 Returns the current stream position.
 
-\membersection{wxOutputStream::Write}
+
+\membersection{wxOutputStream::Write}\label{wxoutputstreamwrite}
 
 \func{wxOutputStream\&}{Write}{\param{const void *}{buffer}, \param{size\_t}{ size}}
 
-Writes the specified amount of bytes using the data of \it{buffer}. 
-\it{WARNING!} The buffer absolutely needs to have at least the specified size.
+Writes up to the specified amount of bytes using the data of {\it buffer}. Note
+that not all data can always be written so you must check the number of bytes
+really written to the stream using \helpref{LastWrite()}{wxoutputstreamlastwrite} 
+when this function returns. In some cases (for example a write end of a pipe
+which is currently full) it is even possible that there is no errors and zero
+bytes have been written.
 
 This function returns a reference on the current object, so the user can test
 any states of the stream right away.
