X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/c7d9131ae533ccecb10f4dcebcb820a7e062a11c..9cd6d737d5adc5fe415cddb3ef0024b9da2b9e08:/docs/latex/wx/outptstr.tex

diff --git a/docs/latex/wx/outptstr.tex b/docs/latex/wx/outptstr.tex
index af0d1c54d0..0eb87f886e 100644
--- a/docs/latex/wx/outptstr.tex
+++ b/docs/latex/wx/outptstr.tex
@@ -3,6 +3,8 @@
 % -----------------------------------------------------------------------------
 \section{\class{wxOutputStream}}\label{wxoutputstream}
 
+wxOutputStream is an abstract base class which may not be used directly.
+
 \wxheading{Derived from}
 
 \helpref{wxStreamBase}{wxstreambase}
@@ -11,6 +13,8 @@
 
 <wx/stream.h>
 
+\latexignore{\rtfignore{\wxheading{Members}}}
+
 % -----------
 % ctor & dtor
 % -----------
@@ -30,6 +34,8 @@ Destructor.
 
 \constfunc{size\_t}{LastWrite}{\void}
 
+Returns the number of bytes written during the last Write().
+
 \membersection{wxOutputStream::PutC}
 
 \func{void}{PutC}{\param{char}{ c}}
@@ -53,8 +59,8 @@ Returns the current stream position.
 
 \func{wxOutputStream\&}{Write}{\param{const void *}{buffer}, \param{size\_t}{ size}}
 
-Writes the specified amount of bytes using the data of \it{buffer}. 
-\it{WARNING!} The buffer absolutely needs to have at least the specified size.
+Writes the specified amount of bytes using the data of {\it buffer}. 
+{\it WARNING!} The buffer absolutely needs to have at least the specified size.
 
 This function returns a reference on the current object, so the user can test
 any states of the stream right away.
