X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/c7d9131ae533ccecb10f4dcebcb820a7e062a11c..86b79b93fbbb0c2e90e6595f7fea0f979b80881c:/docs/latex/wx/outptstr.tex?ds=sidebyside

diff --git a/docs/latex/wx/outptstr.tex b/docs/latex/wx/outptstr.tex
index af0d1c54d0..5ebf899fa5 100644
--- a/docs/latex/wx/outptstr.tex
+++ b/docs/latex/wx/outptstr.tex
@@ -3,6 +3,8 @@
 % -----------------------------------------------------------------------------
 \section{\class{wxOutputStream}}\label{wxoutputstream}
 
+wxOutputStream is an abstract base class which may not be used directly.
+
 \wxheading{Derived from}
 
 \helpref{wxStreamBase}{wxstreambase}
@@ -11,6 +13,8 @@
 
 <wx/stream.h>
 
+\latexignore{\rtfignore{\wxheading{Members}}}
+
 % -----------
 % ctor & dtor
 % -----------
@@ -30,6 +34,8 @@ Destructor.
 
 \constfunc{size\_t}{LastWrite}{\void}
 
+Returns the number of bytes written during the last Write().
+
 \membersection{wxOutputStream::PutC}
 
 \func{void}{PutC}{\param{char}{ c}}
@@ -37,12 +43,22 @@ Destructor.
 Puts the specified character in the output queue and increments the
 stream position.
 
-\membersection{wxOutputStream::SeekO}
+\membersection{wxOutputStream::SeekO}\label{wxoutputstreamseeko}
 
-\func{off\_t}{SeekO}{\param{off\_t}{ pos}, \param{wxSeekMode}{ mode}}
+\func{off\_t}{SeekO}{\param{off\_t}{ pos}, \param{wxSeekMode}{ mode = wxFromStart}}
 
 Changes the stream current position.
 
+\wxheading{Parameters}
+
+\docparam{pos}{Offset to seek to.}
+
+\docparam{mode}{One of {\bf wxFromStart}, {\bf wxFromEnd}, {\bf wxFromCurrent}.}
+
+\wxheading{Return value}
+
+The new stream position or wxInvalidOffset on error.
+
 \membersection{wxOutputStream::TellO}
 
 \constfunc{off\_t}{TellO}{\void}
@@ -53,8 +69,8 @@ Returns the current stream position.
 
 \func{wxOutputStream\&}{Write}{\param{const void *}{buffer}, \param{size\_t}{ size}}
 
-Writes the specified amount of bytes using the data of \it{buffer}. 
-\it{WARNING!} The buffer absolutely needs to have at least the specified size.
+Writes the specified amount of bytes using the data of {\it buffer}. 
+{\it WARNING!} The buffer absolutely needs to have at least the specified size.
 
 This function returns a reference on the current object, so the user can test
 any states of the stream right away.
