X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/c7952709e9b3e4f1bd2ec376ba8a55d090f4e2fd..df10208f26d2659e5995fd00debeb4eaa11174cc:/docs/latex/wx/dropsrc.tex?ds=sidebyside

diff --git a/docs/latex/wx/dropsrc.tex b/docs/latex/wx/dropsrc.tex
index 5d4e98e88a..dd1ccce9ef 100644
--- a/docs/latex/wx/dropsrc.tex
+++ b/docs/latex/wx/dropsrc.tex
@@ -96,7 +96,7 @@ wxDragMove}, {\tt wxDragCancel} or {\tt wxDragNone} if an error occured.
 
 \membersection{wxDropSource::GiveFeedback}\label{wxdropsourcegivefeedback}
 
-\func{virtual bool}{GiveFeedback}{\param{wxDragResult }{effect}, \param{bool }{scrolling}}
+\func{virtual bool}{GiveFeedback}{\param{wxDragResult }{effect}}
 
 Overridable: you may give some custom UI feedback during the drag and drop operation
 in this function. It is called on each mouse move, so your implementation must not be too
