X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/c7074d44198d548dd19e7906b697d019b3c01770..c266eff98c5e44012647f54f38a1e29ecabd8759:/docs/latex/wx/dataviewcolumn.tex

diff --git a/docs/latex/wx/dataviewcolumn.tex b/docs/latex/wx/dataviewcolumn.tex
index bf8e50e407..a8c6b839fd 100644
--- a/docs/latex/wx/dataviewcolumn.tex
+++ b/docs/latex/wx/dataviewcolumn.tex
@@ -41,10 +41,9 @@ enum wxDataViewColumnFlags
 
 \membersection{wxDataViewColumn::wxDataViewColumn}\label{wxdataviewcolumnwxdataviewcolumn}
 
-\func{}{wxDataViewColumn}{\param{const wxString\& }{title}, \param{wxDataViewRenderer* }{renderer}, \param{unsigned int }{model\_column}, \param{int }{width = 80}, \param{int }{flags = wxDATAVIEW\_COL\_RESIZABLE}}
+\func{}{wxDataViewColumn}{\param{const wxString\& }{title}, \param{wxDataViewRenderer* }{renderer}, \param{unsigned int }{model\_column}, \param{int }{width = wxDVC\_DEFAULT\_WIDTH}, \param{wxAlignment }{align = wxALIGN\_CENTRE}, \param{int }{flags = wxDATAVIEW\_COL\_RESIZABLE}}
 
-
-\func{}{wxDataViewColumn}{\param{const wxBitmap\& }{bitmap}, \param{wxDataViewRenderer* }{renderer}, \param{unsigned int }{model\_column}, \param{int }{width = 80}, \param{int }{flags = wxDATAVIEW\_COL\_RESIZABLE}}
+\func{}{wxDataViewColumn}{\param{const wxBitmap\& }{bitmap}, \param{wxDataViewRenderer* }{renderer}, \param{unsigned int }{model\_column}, \param{int }{width = wxDVC\_DEFAULT\_WIDTH}, \param{wxAlignment }{align = wxALIGN\_CENTRE}, \param{int }{flags = wxDATAVIEW\_COL\_RESIZABLE}}
 
 Constructors.
 
@@ -128,9 +127,14 @@ a little arrow.
 
 \func{void}{SetSortable}{\param{bool }{sortable}}
 
-Indicate that the column is sortable. This is only to provide a
-visual hint in the column (such as a sort order indicator). It
-will not actually sort the data. 
+Indicate that the column is sortable. This does
+not show any sorting indicate yet, but it does
+make the column header clickable. Call 
+\helpref{SetSortOrder}{wxdataviewcolumnsetsortorder}
+afterwards to actually make the sort indicator appear.
+If {\it sortable} is false, the column header is
+no longer clickable and the sort indicator (little
+arrow) will disappear.
 
 \membersection{wxDataViewColumn::SetTitle}\label{wxdataviewcolumnsettitle}
 
